-- Customer specific once-script CONN50.
--
-- (c) 2012 SG|facilitor bv 
-- $Revision: 1 $ 
-- $Modtime: 1-02-12 13:30 $
--
-- Support: +31 53 4800700
SET ECHO ON
SPOOL xconn50.lst
SET DEFINE OFF

-- CONN#22359: Variabel aantal glaswasbeurten per gebouw!
ALTER TABLE conn_imp_inspectieobj ADD (CNT_CONTRACT_NUMMER_INTERN VARCHAR2 (30));

BEGIN adm.systrackscript('$Workfile: CONN50.sql $', '$Revision: 1 $', 1); END;
/

SPOOL OFF

@conn.sql
